<template>
	<view class="site-wrapper">
		
		<view style="height: calc(100vh - 200rpx)">
			<view class="cu-list menu-avatar">
				<view class="cu-item"  :class="modalName=='move-box-'+ index?'move-cur':''" v-for="(item,index) in controlReport"
				 :key="index" :data-target="'move-box-' + index"  @tap="goDetail(item.id)" >
					<view class="cu-avatar round lg" style="background-image:url(../../../static/controlReportIcon.png)"></view>
					<view class="content">
						<view class="pro-title">
							<view class="cut inOneLine">{{item.supervision_title}}</view>
						</view>
						<view class="pro-date inOneLine">{{item.site_name}}</view>
						<view class="pro-date inOneLine">{{item.create_time}}</view>
						
						
					</view>
					<view class="nav-right num">
						<view class="text-grey">
							<text class="icon iconfont margin-right-sm margin-left-lg">&#xe629;</text>
						</view>
					</view>
				</view>
			</view>
			
			<view v-if="!controlReport.length&&siteListRes==1" class="text-center margin-top"> 暂无数据</view>
			<view v-show="isLoadMore&&this.currentPage>1" style="padding-bottom:60px">
				<uni-load-more :status="loadStatus"></uni-load-more>
			</view>
			
			
		</view>
		
		<!-- 新增按钮start -->
		<view <view style="width: 100%;
    position: fixed;
    bottom: 0px;
    right: 0px;
    height: 64px;
    background: #fff">
	<view class="plus">
		<image src="../../../static/plus.png" style="width:100rpx;height:100rpx" @tap="goAddPage()"></image>
	</view></view>
		
		<!-- 新增按钮end -->
	</view>

	
</template>

<script>
	export default {
		data() {
			return {
				controlReport: [],
				modalName: null,
				siteListRes: 0,
				
				currentPage: 1,
				size: 11,
				loadStatus: 'loading', //加载样式：more-加载前样式，loading-加载中样式，nomore-没有数据样式
				isLoadMore: false, //是否加载中
			};
		},
		
		onReachBottom() { //上拉触底函数
		
			if (!this.isLoadMore) { //此处判断，上锁，防止重复请求
				this.isLoadMore = true
				this.currentPage += 1;
				this.loadData()
			}
		},
		
		onLoad:function(option){
			this.loadData()
			
		},
	
		methods: {
		
			// 页面跳转
			goAddPage(item) {
				uni.redirectTo({
					url: '/pages/eleControl/controlReport/controlReportAdd/controlReportAdd',
				});
			},
			
			goDetail(id) {
				uni.navigateTo({
					url: '/pages/eleControl/controlReport/controlReportDetail/controlReportDetail?id='+id,
				});
			},
			
			loadData(){
				this.getDataList({
					currentPage: this.currentPage,
					size: this.size,
				})
				
			},
			
			//数据请求
			async getDataList(params = {}) {
				const res = await this.$myRequest({
					url: 'MonitoringReporting/getMonitoringReportingList',
					showLoading: true,
					data: params
				})
				this.siteListRes = 1;
				
				if (res.data.total) {
					
					// this.controlReport = res.data.data
					this.controlReport = this.controlReport.concat(res.data.data)
					if (res.data.data.length < this.size) { //判断接口返回数据量小于请求数据量，则表示此为最后一页
						this.isLoadMore = true
						this.loadStatus = 'nomore'
					} else {
						this.isLoadMore = false
					}
					console.log('this.controlReport')
					console.log(this.controlReport)
				} else {
					
					this.isLoadMore = true
					this.loadStatus = 'nomore'
				}
				
			}
		}

	}
</script>

<style lang="scss">
	.cu-item{
		height:160rpx!important
	}
</style>
