<template>
	<view class="content">
		<view @click="echarts.onClick" :prop="option" :change:prop="echarts.updateEcharts" id="echarts" class="echarts"></view>
	</view>
</template>

<script>
	// let echartData = [{
	// 		name: "电力监测",
	// 		value: 1000
	// 	},
	// 	{
	// 		name: "视频监测",
	// 		value: 2920
	// 	},
	// ];
	let title = '报警总数';
	// let total = echartData.reduce((a, b) => {
	// 	return a + b.value * 1
	// }, 0);


	export default {
		name: 'chart',
		props: {
			bindData: {
				type: Object,
				default: ''
			}
		},
		data() {
			return {
				option: {
					color: ['#67e0e3', '#e062ae'],
					tooltip: {
						trigger: 'item',
						// formatter: "{b}: {c} ({d}%)",
						formatter: "{b}: {c} ",
						position: ['50%', '50%']
					},
					title: [{ //aa标题
						text: '{val|' + this.bindData.alarmCount + '}\n{name|' + title + '}',
						top: '45%',
						left: 'center',
						textStyle: {
							rich: {
								name: {
									fontSize: 14,
									fontWeight: 'normal',
									color: '#666666',
									padding: [5, 0]
								},
								val: {
									fontSize: 24,
									color: '#333333',
								}
							}
						}
					}],
					legend: { //aa图例
						orient: 'horizontal',
						icon: 'circle',
						itemWidth: 12,
						itemHeight: 12,
						itemGap: 60,
						// top: -10,
						textStyle: {

							fontSize: 14,
							rich: {
								name: {
									fontSize: 18
								},
								value: {
									fontSize: 14,
									padding: [0, 20, 0, 5]
								},

							}
						},
					},
					series: [{
						name: '报警分析',
						type: 'pie',
						radius: ['40%', '60%'], //aa环装圈粗细
						center: ['50%', '55%'],

						itemStyle: {
							normal: {
								shadowBlur: 20,
								shadowColor: '#F9F5F7',
								shadowOffsetX: 0,
								shadowOffsetY: 0,
							},
						},

						data: [{
								name: "电力监测",
								value: this.bindData.smartElectricityCount?this.bindData.smartElectricityCount:0
							},
							{
								name: "视频监测",
								value: this.bindData.videoMonitoringCount?this.bindData.videoMonitoringCount:0
							},

						],

						labelLine: {
							normal: {
								length: 10, //aa折线长度
								length2: 20, //aa折线长度

							}
						},
						label: {
							normal: {
								formatter: '{b}：{d}%',
								// formatter: params => {
								// 	var percent = 0;
								// 	var total = 0;
								// 	for (var i = 0; i < echartData.length; i++) {
								// 		total += echartData[i].value;
								// 	}
								// 	console.log(111);
								// 	console.log(total);
								// 	percent = ((params.value / total) * 100).toFixed(0);
								// 	return params.name + ': ' + percent + '%';
								// },
							}
						},
					}]
				}
			}
		},
		onLoad() {

		},
		methods: {
			changeOption() {
				const data = this.option.series[0].data
				// 随机更新示例数据
				data.forEach((item, index) => {
					data.splice(index, 1, Math.random() * 40)
				})
			},
			onViewClick(options) {
				console.log(options)
			}
		}
	}
</script>

<script module="echarts" lang="renderjs">
	let myChart
	export default {
		mounted() {
			if (typeof window.echarts === 'function') {
				this.initEcharts()
			} else {
				// 动态引入较大类库避免影响页面展示
				const script = document.createElement('script')
				// view 层的页面运行在 www 根目录，其相对路径相对于 www 计算
				script.src = '/static/echarts.min.js'
				script.onload = this.initEcharts.bind(this)
				document.head.appendChild(script)
			}
		},
		methods: {
			initEcharts() {
				myChart = echarts.init(document.getElementById('echarts'))
				// 观测更新的数据在 view 层可以直接访问到
				myChart.setOption(this.option)
			},
			updateEcharts(newValue, oldValue, ownerInstance, instance) {
				// 监听 service 层数据变更
				myChart.setOption(newValue)
			},
			onClick(event, ownerInstance) {
				// 调用 service 层的方法
				ownerInstance.callMethod('onViewClick', {
					test: 'test'
				})
			}
		}
	}
</script>

<style>
	.content {
		display: flex;
		flex-direction: column;
		align-items: center;
		justify-content: center;
		width:100%;
		height:100%
	}

	.echarts {
		width: 100%;
		height: 520rpx;
		margin-top: 70rpx;
	}
</style>
