<template>
	<view>

		<!-- 筛选框start -->
		<view style="line-height:100rpx;text-align:center">建筑名称：{{getDetailData.company_name}}</view>
		<!-- 筛选框end -->

		<view class="processStatus  bg-white margin-bottom-sm" style="">
			<view class="info-tit margin-left-xs">
				<text class="cuIcon-titles margin-right-xs"></text>
				安全分析
			</view>
			<view class="padding-lr padding-bottom-lg" style="min-height:500rpx">
				<chart :bindData="this.getDetailData" v-if="this.getDetailData.address"></chart>
			</view>
		</view>

		<view class="basic-info  bg-white margin-bottom-sm">
			<view class="info-tit margin-left-xs">
				<text class="cuIcon-titles margin-right-xs"></text>
				消防各子系统安装情况
			</view>
			<view class="info-content padding-lr padding-bottom">
				<table style="border:1px solid #ccc" cellspacing="0" cellpadding="0" align="center">
					<tr>
						<td>子系统安装情况</td>
						<td>报警数</td>
						<td>误报频率</td>
					</tr>
					<tr>
						<td>用户信息传输装置 </td>
						<td>报警数量{{this.getDetailData.count_yc}}，处理{{this.getDetailData.count_ycl_yc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_yc,this.getDetailData.count_yc)}}</td> 
					</tr>
					<tr>
						<td>水系统</td>
						<td>报警数量{{this.getDetailData.count_sj}}，处理{{this.getDetailData.count_ycl_sj}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_sj,this.getDetailData.count_sj)}}</td>
					</tr>
					<tr>
						<td>烟感</td>
						<td>报警数量{{this.getDetailData.count_yg}}，处理1{{this.getDetailData.count_ycl_yg}} </td>
						<td>{{GetPercent(this.getDetailData.count_ycl_yg,this.getDetailData.count_yg)}} </td>
					</tr>
					<tr>
						<td>消防栓</td>
						<td>报警数量{{this.getDetailData.count_xfs}}，处理{{this.getDetailData.count_ycl_xfs}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_xfs,this.getDetailData.count_xfs)}} </td>
					</tr>
					<tr>
						<td>液位</td>
						<td>报警数量{{this.getDetailData.count_yw}}，处理{{this.getDetailData.count_ycl_yw}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_yw,this.getDetailData.count_yw)}} </td>
					</tr>
					<tr>
						<td>RTU</td>
						<td>报警数量{{this.getDetailData.count_rtu}}，处理{{this.getDetailData.count_ycl_rtu}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_rtu,this.getDetailData.count_rtu)}} </td>
					</tr>
					<tr>
						<td>电气火灾</td>
						<td>报警数量{{this.getDetailData.count_dqhz}}，处理{{this.getDetailData.count_ycl_dqhz}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_dqhz,this.getDetailData.count_dqhz)}} </td>
					</tr>
					<tr>
						<td>视频监测</td>
						<td>报警数量{{this.getDetailData.count_spjc}}，处理{{this.getDetailData.count_ycl_spjc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_spjc,this.getDetailData.count_spjc)}} </td>
					</tr>
					<tr>
						<td>电梯监测</td>
						<td>报警数量{{this.getDetailData.count_dtjc}}，处理{{this.getDetailData.count_ycl_dtjc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_dtjc,this.getDetailData.count_dtjc)}} </td>
					</tr>
					<tr>
						<td>井盖监测</td>
						<td>报警数量{{this.getDetailData.count_jgjc}}，处理{{this.getDetailData.count_ycl_jgjc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_jgjc,this.getDetailData.count_jgjc)}} </td>
					</tr>
					<tr>
						<td>地磁监测</td>
						<td>报警数量{{this.getDetailData.count_dcjc}}，处理{{this.getDetailData.count_ycl_dcjc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_dcjc,this.getDetailData.count_dcjc)}} </td>
					</tr>
					<tr>
						<td>门禁监测</td>
						<td>报警数量{{this.getDetailData.count_mcjc}}，处理{{this.getDetailData.count_ycl_mcjc}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_mcjc,this.getDetailData.count_mcjc)}} </td>
					</tr>
					<tr>
						<td>可燃气体监测</td>
						<td>报警数量{{this.getDetailData.count_krqt}}，处理{{this.getDetailData.count_ycl_krqt}}</td>
						<td>{{GetPercent(this.getDetailData.count_ycl_krqt,this.getDetailData.count_krqt)}} </td>
					</tr>
				</table>
			</view>
		</view>


		<view class="processStatus  bg-white margin-bottom-sm">
			<view class="info-tit margin-left-xs">
				<text class="cuIcon-titles margin-right-xs"></text>
				存在问题或需要改进事项
			</view>
			<view class="padding-lr padding-bottom-lg" style="font-size:30rpx;text-indent:60rpx;line-height:1.7">
				<view v-if="this.getDetailData.state_yc==1">用户信息传输装置该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_sj==1">水系统该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_yg==1"> 烟感栓该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_xfs==1"> 消防栓该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_yw==1">液位该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_rtu==1">RTU该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_dqhz==1">电气火灾该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_spjc==1"> 视频监测该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_dtjc==1"> 电梯监测该类设备隐患极高或存在故障，建议尽早进行排查； </view>
				<view v-if="this.getDetailData.state_dcjc==1">地磁监测该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_mcjc ==1">门禁监测该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				<view v-if="this.getDetailData.state_krqt==1">可燃气体监测该类设备隐患极高或存在故障，建议尽早进行排查；</view>
				
			</view>
		</view>

		<view class="processStatus  bg-white margin-bottom-sm">
			<view class="info-tit margin-left-xs">
				<text class="cuIcon-titles margin-right-xs"></text>
				其他事宜
			</view>
			<view class="padding-lr padding-bottom-lg" style="font-size:30rpx;text-indent:60rpx;line-height:1.7">
				
				<view v-if="this.getDetailData.state_yc==0">目前数据反映：用户信息传输装置该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_sj==0">目前数据反映：水系统该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_yg==0">目前数据反映： 烟感栓该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_xfs==0">目前数据反映： 消防栓该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_yw==0">目前数据反映：液位该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_rtu==0">目前数据反映：RTU该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_dqhz==0">目前数据反映：电气火灾该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_spjc==0">目前数据反映： 视频监测该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_dtjc==0">目前数据反映： 电梯监测该类设备通信情况较好，需要保持； </view>
				<view v-if="this.getDetailData.state_dcjc==0">目前数据反映：地磁监测该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_mcjc ==0">目前数据反映：门禁监测该类设备通信情况较好，需要保持；</view>
				<view v-if="this.getDetailData.state_krqt==0">目前数据反映：可燃气体监测该类设备通信情况较好，需要保持；</view>
			
			</view>
		</view>

	</view>
</template>

<script>
	// import json from '../../data/json.js';
	import chart from './components/chart/chart.vue';
	export default {
		components: {
			chart,

		},
		data() {
			return {
				
				getDetailData:{},
				// deviceOffLineData:json.deviceOffLineData,
				siteListRes: 0,
				siteName: '',
				type: '0',
				siteListData: [],
				modalName: null,
				listTouchStart: 0,
				listTouchDirection: null,
				CustomBar: this.CustomBar,

				staticData: {
					"msg": "\u64cd\u4f5c\u6210\u529f",
					"flag": true,
					"companyCode": "1,2,3,4,5,6,7,8,12,13,14,16,17,18,19,20,21,22,23,24,25,26,27,28,29,30,31,32,33,34,35,36,37,38,39",
					"data": [{
						"statisticalPeriod": "2021-03-16~2021-04-16",
						"smartElectricityCount": "178",
						"videoMonitoringCount": "12456",
						"alarmCount": 12627,
						"eventCount": 2,
						"hiddenDangerCount": 4,
						"offlineCount": 20,
						"faultCount": 30,
						"earlyWarningCount": 100,
						"otherCount": 99,
						"normalCount": 66,
						"integratedAlarmCount": 12627,
						"unprocessedCount": 0
					}]
				}


			}
		},
		
		onLoad: function(option) {
			this.getDetails({'company_code':uni.getStorageSync('selectedCode')})
		},
		
		methods: {
			
			GetPercent(num, total) {
			    /// <summary>
			    /// 求百分比
			    /// </summary>
			    /// <param name="num">当前数</param>
			    /// <param name="total">总数</param>
			    num = parseFloat(num);
			    total = parseFloat(total);
			    if (isNaN(num) || isNaN(total)) {
			        return "-";
			    }
			    return total <= 0 ? "0%" : (Math.round(num / total * 10000) / 100.00)+"%";
			},
			// 建筑体检数据请求
			async getDetails(params = {}) {
				const res = await this.$myRequest({
					url: 'PhysicalExamination/getPhysicalExamination',
					data: params,
					showLoading: true
				})
				this.getDetailData = res.data.data[0];
				
			},
			
			InputFocus(e) {
				this.InputBottom = e.detail.height
			},
			InputBlur(e) {
				this.InputBottom = 0
			},





		}
	}
</script>

<style lang="scss">
	page {
		background: #EDEDED;
	}

	/deep/ .leave_cont .ul .li {
		width: 42% !important;

	}

	/deep/ .leave_cont .ul {
		background: #fff;

	}

	/deep/ .date {
		font-size: 28rpx;
	}

	/deep/ .leave_cont {
		width: 76%
	}
</style>
