<template>
	<view>
		<view class="processStatus">
			<view class="info-tit margin-left-xs">
				<text class="cuIcon-titles margin-right-xs"></text>
				表格
			</view>
			<view class="info-content padding" style="overflow:auto;width:97%">
				<table style="width:140%">
					<tr>
						<th>名称</th>
						<th>类型</th>
						<th>端口</th>
						<th>最后上传值</th>
						<th>最后上传时间</th>
					</tr>
					<tr>
						<td>消防泵手自动状态</td>
						<td>开关量</td>
						<td>01</td>
						<td>关闭</td>
						<td>2021-01-19 11:06:40</td>
					</tr>
					<tr>
						<td>消防泵手自动状态</td>
						<td>开关量</td>
						<td>01</td>
						<td>关闭</td>
						<td>2021-01-19 11:06:40</td>
					</tr>
					<tr>
						<td>消防泵手自动状态</td>
						<td>开关量</td>
						<td>01</td>
						<td>关闭</td>
						<td>2021-01-19 11:06:40</td>
					</tr>
				</table>
			</view>
		</view>

	</view>
</template>

<script>
	export default {
		data() {
			return {

			}
		},
		methods: {

		}
	}
</script>

<style>

</style>
